Article 1
Article 1(3) of Decision 1999/70/EC shall be replaced by the following:
3.
Deloitte, S.L. is hereby approved as the external auditor of the Banco de España for the financial years 2006 to 2008.
This mandate may be renewed thereafter on a yearly basis until the end of the financial year 2012.