Article 1
Mr José MONTILLA AGUILERA, Presidente de la Generalitat de Cataluña, is hereby appointed a member of the Committee of the Regions in place of Mr Pasqual MARAGALL i MIRA for the remainder of his term of office, which runs until 25 January 2010.