Article 1
The aid granted to Schneider AG, Türkheim, in the amount of EUR 6 498 468,68 for the research project ‘Laser-Display-Technologie’ and in the amount of EUR 1 275 826,6 for the R&D project ‘Laser-Display-Technologie — Systemintegration und Prototypen’ is compatible with the common market.