Article 1
Subject matter and scope
Article 2
Collection and analyses of isolates
Article 3
Confidentiality of the data
Article 4
Application
Article 5. . . . . . . . . ....
ANNEX
TECHNICAL SPECIFICATIONS REFERRED TO IN ARTICLE 2
1.
Origin of isolates
2.
Number of isolates to be tested
3.
Antimicrobial susceptibility testing
4.
Collection of the data and reporting
Commission Decision
of 12 June 2007
on a harmonised monitoring of antimicrobial resistance in Salmonella in poultry and pigs
(notified under document number C(2007) 2421)
(Text with EEA relevance)
(2007/407/EC) (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2013/652/EU: Commission Implementing Decision of 12 November 2013 on the monitoring and reporting of antimicrobial resistance in zoonotic and commensal bacteria (notified under document C(2013) 7145) Text with EEA relevance.