Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2013/652/EU: Commission Implementing Decision of 12 November 2013 on the monitoring and reporting of antimicrobial resistance in zoonotic and commensal bacteria (notified under document C(2013) 7145) Text with EEA relevance.