Definitions
Article 1
For the purposes of this Decision, the following definitions shall apply:
1. ‘Market share for refrigeration’ means the average market share of sales of hydrochlorofluorocarbons for refrigeration applications of a producer in the years 1997, 1998 and 1999 as a percentage of the total market for refrigeration applications;
2. ‘Market share for foam production’ means the average market share of sales of hydrochlorofluorocarbons for foam production of a producer in the years 1997, 1998 and 1999 as a percentage of the total market for foam production; and
3. ‘Market share for solvent uses’ means the average market share of sales of hydrochlorofluorocarbons for solvent uses of a producer in the years 1997, 1998 and 1999 as a percentage of the total market for solvent uses.