Plan for the emergency vaccination against classical swine fever of pigs in pig holdings with a live attenuated conventional vaccine
Article 4
The plan submitted by Romania to the Commission on 27 September 2006 for the emergency vaccination against classical swine fever of pigs in pig holdings with a live attenuated conventional vaccine, in the area as set out in point 4 of the Annex, is approved.