Article 1
The Annex to Decision 2000/147/EC is amended in accordance with...
Article 2
This Decision is addressed to the Member States.
ANNEX
The Annex to Decision 2000/147/EC is amended as follows:
The title of Table 1 is replaced by ‘CLASSES OF...
Commission Decision
of 27 October 2006
amending Decision 2000/147/EC implementing Council Directive 89/106/EEC as regards the classification of the reaction-to-fire performance of construction products
(notified under document number C(2006) 5063)
(Text with EEA relevance)
(2006/751/EC)
THE COMMISSION OF THE EUROPEAN COMMUNITIES,
Having regard to the Treaty establishing the European Community,
Having regard to Council Directive 89/106/EEC of 21 December 1988, on the approximation of laws, regulations and administrative provisions of the Member States relating to construction products and in particular Article 20(2) thereof,
Whereas:
(1)
Commission Decision 2000/147/EC established a classification system for the reaction-to-fire performance of construction products.
(2)
Following a review of certain product families, separate classes of reaction-to-fire performance should be established for electric cables.
(3)
Decision 2000/147/EC should therefore be amended accordingly.
(4)
The measures provided for in this Decision are in accordance with the opinion of the Standing Committee on Construction,
HAS ADOPTED THIS DECISION:
OJ L 40, 11.2.1989, p. 12. Directive as last amended by Regulation (EC) No 1882/2003 of the European Parliament and of the Council (OJ L 284, 31.10.2003, p. 1).
OJ L 50, 23.2.2000, p. 14.