Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2011/787/EU: Commission Implementing Decision of 29 November 2011 authorising Member States temporarily to take emergency measures against the dissemination of Ralstonia solanacearum (Smith) Yabuuchi et al. as regards Egypt (notified under document C(2011) 8618).