Article 1. . . . . . . . . ....
Article 2. . . . . . . . . ....
Commission Decision
of 12 October 2006
amending, for the purposes of adapting to technical progress, the Annex to Directive 2002/95/EC of the European Parliament and of the Council as regards exemptions for applications of lead in crystal glass
(notified under document number C(2006) 4789)
(Text with EEA relevance)
(2006/690/EC) (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2011/65/EU of the European Parliament and of the Council of 8 June 2011 on the restriction of the use of certain hazardous substances in electrical and electronic equipment Text with EEA relevance.