Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Decision of 4 April 2011 concerning the technical specifications of interoperability relating to the subsystem ‘rolling stock – noise’ of the trans-European conventional rail system (notified under document C(2011) 658) (Text with EEA relevance) (2011/229/EU).