Article 2 The appropriate Minister shall apply the diagnostic manual from the date they transpose Directive 2005/94/EC or from 1 July 2007, whichever date is the earlier.
Words in Art. 2 substituted (31.12.2020) by The Exotic Disease (Amendment etc.) (EU Exit) Regulations 2018 (S.I. 2018/1410), regs. 1, 10(2); 2020 c. 1, Sch. 5 para. 1(1)