Entry into force
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EU) No 1291/2013 of the European Parliament and of the Council of 11 December 2013 establishing Horizon 2020 - the Framework Programme for Research and Innovation (2014-2020) and repealing Decision No 1982/2006/EC Text with EEA relevance.