Decision No 1364/2006/EC of the European Parliament and of the Council
of 6 September 2006
laying down guidelines for trans-European energy networks and repealing Decision 96/391/EC and Decision No 1229/2003/EC (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EU) No 347/2013 of the European Parliament and of the Council of 17 April 2013 on guidelines for trans-European energy infrastructure and repealing Decision No 1364/2006/EC and amending Regulations (EC) No 713/2009, (EC) No 714/2009 and (EC) No 715/2009 (Text with EEA relevance).

Article 1 Subject matter
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Priorities for action
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Lines of action
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Projects of common interest
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Priority projects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Projects of European interest
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Implementation of projects of European interest
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 European coordinator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 More favourable context
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Effects on competition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 13 Restrictions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 15 Report
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 16 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 17 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 18 Addressees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I TRANS-EUROPEAN ENERGY NETWORKS

Axes for priority projects, including sites of projects of European interest, as defined in Articles 7 and 8
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ELECTRICITY NETWORKS

EL.1. France — Belgium — Netherlands — Germany:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.2. Borders of Italy with France, Austria, Slovenia and Switzerland:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.3. France — Spain — Portugal:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.4. Greece — Balkan countries — UCTE System:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.5. United Kingdom — continental Europe and northern Europe:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.6. Ireland — United Kingdom:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.7. Denmark — Germany — Baltic Ring (including Norway — Sweden — Finland — Denmark — Germany — Poland — Baltic States — Russia):
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.8. Germany — Poland — Czech Republic — Slovakia — Austria — Hungary — Slovenia:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EL.9. Mediterranean Member States — Mediterranean Electricity Ring
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GAS NETWORKS

NG.1. United Kingdom — northern continental Europe, including the Netherlands, Belgium, Denmark, Sweden and Germany — Poland — Lithuania — Latvia — Estonia — Finland — Russia:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

NG.2. Algeria — Spain — Italy — France — northern continental Europe:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

NG.3. Caspian Sea countries — Middle East — EU:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

NG.4. Liquefied natural gas (LNG) terminals in Belgium, France, Spain, Portugal, Italy, Greece, Cyprus and Poland:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

NG.5. Underground natural gas storage in Spain, Portugal, France, Italy, Greece and the Baltic Sea Region:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

NG.6. Mediterranean Member States — East Mediterranean Gas Ring:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II TRANS-EUROPEAN ENERGY NETWORKS

Additional criteria for identifying Projects of common interest, as referred to in Article 6(2)

ELECTRICITY NETWORKS

1. Developing electricity networks in island, isolated, peripheral and ultraperipheral regions while promoting the diversification of energy sources and enhancing the use of renewable energy, and connection of the electricity networks of those regions, if appropriate:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Developing the electricity connections between the Member States needed for the functioning of the internal market and in order to ensure the reliability and dependability of the operation of electricity networks:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Developing electrical connections within the Member States where needed in order to take advantage of the connections between the Member States, the functioning of the internal market or the connection of renewable energy sources:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Developing electricity connections with non-Member States, and more particularly with the candidate countries, thus contributing towards interoperability, the operational reliability and dependability of the electricity grids or the supply of electricity within the European Community:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Actions improving the functioning of the interconnected electricity networks within the internal market, in particular, identifying the bottlenecks and missing links, developing solutions in order to deal with congestion and adapting the methods of forecasting and of operating electricity networks:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GAS NETWORKS

6. Introducing natural gas into new regions, mainly island, isolated, peripheral and ultraperipheral regions, and developing natural gas networks in these regions:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Developing natural gas connections in order to meet the needs of the internal market or strengthening the security of supply, including connection of separate natural gas and olefin gas networks:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. Developing the capacities for receiving LNG and for storage of natural gas needed in order to meet demand, control gas supply systems, and diversify sources and supply routes:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. Developing the natural gas transport capacity (gas supply pipelines) needed in order to meet demand and diversify supplies from internal and external sources, as well as supply routes:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10. Actions improving the functioning of the interconnected natural gas networks within the internal market and transit countries, in particular, identifying the bottlenecks and missing links, developing solutions in order to deal with congestion and adapting methods of forecasting and of operating natural gas networks efficiently and safely:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11. Developing and integrating the olefin gases transport capacity needed in order to meet demand within the internal market:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III TRANS-EUROPEAN ENERGY NETWORKS

Projects of common interest and their specifications, currently identified according to the criteria set out in Annex II

ELECTRICITY NETWORKS

1. Developing electricity networks in isolated regions
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Developing electricity connections between the Member States
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Developing electrical connections within the Member States
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.37. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.38. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.39. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.40. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.41. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.42. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.43. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.44. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.45. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.46. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.47. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.48. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.49. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.50. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.51. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.52. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.53. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.54. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.55. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.56. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.57. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.58. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.59. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.60. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.61. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.62. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.63. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.64. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.65. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.66. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.67. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.68. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.69. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.70. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.71. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.72. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.73. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.74. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.75. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.76. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.77. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.78. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.79. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.80. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.81. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.82 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.83. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.84. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.85. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.86. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Developing electricity connections with non-member States
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Actions improving the functioning of the interconnected electricity networks within the internal market
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GAS NETWORKS

6. Introducing natural gas into new regions
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Developing gas connections in order to meet the needs of the internal market or strengthening of the security of supply, including connection of separate natural gas networks
7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. Developing capacities for receiving LNG and for storage of natural gas
8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.37. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.38. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.39. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. Developing gas transport capacity (gas supply pipelines)
9.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.37. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.38. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.39. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.40. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10. Actions improving the functioning of the interconnected gas networks within the internal market
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .