Commission Decision
of 25 November 2005
amending Decision 2004/4/EC authorising Member States temporarily to take emergency measures against the dissemination of Pseudomonas solanacearum (Smith) Smith as regards Egypt
(notified under document number C(2005) 4525)
(2005/840/EC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2011/787/EU: Commission Implementing Decision of 29 November 2011 authorising Member States temporarily to take emergency measures against the dissemination of Ralstonia solanacearum (Smith) Yabuuchi et al. as regards Egypt (notified under document C(2011) 8618).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .