Article 1 The use of the following methods is authorised for grading pig carcasses pursuant to point 1 of Section B.IV of Annex V to Council Regulation (EC) No 1234/2007 in Cyprus:
OJ L 299, 16.11.2007, p. 1 .
the ‘ Hennessy Grading Probe (HGP 4) ’ apparatus and the assessment methods related thereto, details of which are given in Part I of the Annex,
the ‘ Ultra FOM 300 ’ apparatus and the assessment methods related thereto, details of which are given in Part II of the Annex.
As regards the apparatus ‘Ultra FOM 300’, referred to in the second indent of the first subparagraph, after the end of the measurement procedure it must be possible to verify on the carcass that the apparatus measured the values of measurements X 1 and X 2 on the site provided for in the Annex, Part II, point 3. The corresponding marking of the measurement site must be made at the same time as the measurement procedure.
Substituted by Commission Implementing Decision of 14 July 2011 amending Decision 2005/7/EC authorising a method for grading pig carcasses in Cyprus (notified under document C(2011) 4996) (Only the Greek text is authentic) (2011/418/EU).