Article 1
The State aid which Germany granted to MobilCom AG and MobilCom Holding GmbH in the form of the 80 % deficiency guarantee that was assumed by the Federal Government and the Land of Schleswig‐Holstein on 20 November 2002 for the EUR 112 million loan granted to the company by the consortium of banks with the Kreditanstalt für Wiederaufbau as lead bank is compatible with the common market pursuant to Article 87(3)(c) of the EC Treaty provided that Germany complies with the condition set out in Article 2 of this Decision.