Article 1. . . . . . . . . ....
Article 2. . . . . . . . . ....
Article 3. . . . . . . . . ....
Article 4. . . . . . . . . ....
Article 5. . . . . . . . . ....
Article 6. . . . . . . . . ....
Article 7. . . . . . . . . ....
ANNEX
FRAMEWORK
ECOLOGICAL CRITERIA
1.
Energy savings
System unit
Monitor
2.
Lifetime extension
3.
Mercury content of a liquid crystal display (LCD) monitor
4.
Noise
5.
Electromagnetic emissions
6.
Take-back, recycling and hazardous substances
7.
User instructions
8.
Packaging
9.
Information appearing on the eco-label
Commission Decision
of 11 April 2005
establishing ecological criteria and the related assessment and verification requirements for the award of the Community eco-label to personal computers
(notified under document C(2005) 1024)
(Text with EEA relevance)
(2005/341/EC) (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Decision of 9 June 2011 on establishing the ecological criteria for the award of the EU Ecolabel for personal computers (notified under document C(2011) 3737) (Text with EEA relevance) (2011/337/EU).