2.
From 1 June 2004 until 31 December 2005, the model form E 111 reproduced in Decision No 187 shall be replaced by the model reproduced in the annex to this Decision. In principle, all norms applicable, according to Decision No 190 to the optical-reader data included in the European Card and related to the description, values, length and remarks of the data fields are applicable to the model form E 111.