Article 5
Member States shall ensure that the serological test referred to in Article 2(1)(c)(ii) and in Article 3(1)(b) for the detection of antibodies against the entire BHV1 is standardised against the strong positive, weak positive and negative serum adopted as OIE international standards for BHV1 tests.