Article 4
Notwithstanding the standard presentation referred to in Article 2(1) of Regulation (EEC) No 3220/84, the flare fat, the kidneys and the diaphragm need not be removed from pig carcases before being weighed and graded. In order to establish quotations for pig carcases on a comparable basis, the recorded hot weight shall be reduced:
- for pig carcases up to 56 kg, by 0,7 kg
- for pig carcases from 56,5 to 74,5 kg, by 1,1 kg
- for pig carcases of 75 kg and over, by 1,6 kg.