Article 3
Notwithstanding the standard presentation referred to in Article 2 of Regulation (EEC) No 3220/84, pig carcases may be presented in the United Kingdom of Great Britain and Northern Ireland, with the tongue attached before being weighted and graded. In order to establish quotations for pig carcases on a comparable basis, the recorded hot weight shall be reduced by 0,3 kg.