Article 2
The use of the following methods is hereby authorised for grading pig carcases pursuant to Regulation (EEC) No 3220/84 in Northern Ireland:
- the apparatus termed
‘
Intrascope (Optical Probe)
’
and assessment methods related thereto, details of which are given in Part 1 of Annex II,
- the apparatus termed
‘
Mark II Ulster Probe
’
and assessment methods related thereto, details of which are given in Part 2 of Annex II,
- the apparatus termed
‘
Hennessy Grading Probe (HGP 4)
’
and assessment methods related thereto, details of which are given in Part 3 of Annex II,
- the apparatus termed
‘
Fully automatic ultrasonic carcass grading (Autofom)
’
and assessment methods related thereto, details of which are in Part 4 of Annex II.
Substituted by Commission Decision of 3 February 2006 amending Decision 2004/370/EC authorising methods for grading pig carcases in the United Kingdom (notified under document number C(2006) 213) (Only the English text is authentic) (2006/99/EC).