Commission Decision
of 4 March 2004
authorising laboratories to check the effectiveness of vaccination against rabies in certain domestic carnivores
(notified under document number C(2004) 646)
(Text with EEA relevance)
(2004/233/EC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Decision of 9 August 2010 implementing Council Decision 2000/258/EC as regards proficiency tests for the purposes of maintaining authorisations of laboratories to carry out serological tests to monitor the effectiveness of rabies vaccines (notified under document C(2010) 5421) (Text with EEA relevance) (2010/436/EU).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I NAMES OF LABORATORIES

(BE) Belgium
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(BG) BULGARIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(CZ) Czech Republik
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(DK) Denmark
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(DE) Germany
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(EE) Estonia
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(EL) Greece
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(ES) Spain
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(FR) France
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(IT) Italy
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(LV) Latvia
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(LT) Lithuania
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(HU) Hungary
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(NL) Netherlands
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(AT) Austria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(PL) Poland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(PT) Portugal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(SI) Slovenia
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(SK) Slovakia
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(FI) Finland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

RO ROMANIA
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(SE) Sweden
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(UK) United Kingdom
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX II . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX III . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repealed by Commission Decision of 9 August 2010 implementing Council Decision 2000/258/EC as regards proficiency tests for the purposes of maintaining authorisations of laboratories to carry out serological tests to monitor the effectiveness of rabies vaccines (notified under document C(2010) 5421) (Text with EEA relevance) (2010/436/EU).