Article 7
Member States shall adjust at the latest, by 31 October 2002, the measures which they have adopted with a view to protecting themselves against the introduction and spread of the harmful organism in such a manner that the measures comply with this Decision and shall forthwith inform the Commission of the adjusted measures.