Article 1
For the purpose of this Decision:
1
‘the harmful organism’ means Phytophthora ramorum Werres, De Cock & Man in 't Veld sp. nov.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 1(2)-(4) omitted (31.12.2020) by virtue of The Plant Health (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1482), regs. 2(2)(b), 43(2)