Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Decision of 6 March 2008 concerning a technical specification for interoperability relating to the ‘energy’ sub-system of the trans-European high-speed rail system (notified under document number C(2008) 807) (Text with EEA relevance) (2008/284/CE).