Article 2
1
With regard to the systems referred to in Annex B to the attached TSI, the conditions to be complied with for the verification of the interoperability within the meaning of Article 16(2) of Directive 96/48/EC are the applicable technical rules in use in the Member State which authorises the placing in service of the subsystem concerned by this Decision.
2
Each Member State shall notify to the other Member States and to the Commission within six months of the notification of this Decision:
- the list of the applicable technical rules mentioned under Article 2(1),
- the conformity assessment and checking procedures to be applied with regard to the application of these rules,
- the bodies it appoints for carrying out those conformity assessment and checking procedures.