Quality control
Article 5
The appropriate authority shall ensure the quality of the results of the analysis of samples taken pursuant to
relevant
assimilated
law
, in particular by monitoring tests and/or calibration results according to Chapter 5.9 of ISO 17025 (1).
Words in Art. 5 substituted (31.12.2020) by The Veterinary Medicines and Residues (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1461), regs. 1(2)(b), 6(6)(a)
Words in Art. 5 substituted (31.12.2020) by The Veterinary Medicines and Residues (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1461), regs. 1(2)(b), 6(6)(b)
Word in Art. 5 substituted (27.2.2025) by The Retained EU Law (Revocation and Reform) Act 2023 (Consequential Amendments) Regulations 2025 (S.I. 2025/82), reg. 1(2), Sch. 15 para. 62(2)(d)