Minimum required performance limits
Article 4
The appropriate authority
shall ensure that the analytical methods used for detecting the following substances meet the minimum required performance limits (MRPLs) set out in Annex II, against the matrixes referred to in that Annex:
a
chloramphenicol;
b
nitrofuran metabolites;
c
medroxyprogesterone.
d
malachite green.
Replaced by 2004/25/EC: Commission Decision of 22 December 2003 amending Decision 2002/657/EC as regards the setting of minimum required performance limits (MRPLs) for certain residues in food of animal origin (Text with EEA relevance) (notified under document number C(2003) 4961)
Words in Art. 4 substituted (31.12.2020) by The Veterinary Medicines and Residues (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1461), regs. 1(2)(b), 6(5)