Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Decision of 31 October 2008 implementing Council Directive 2006/88/EC as regards surveillance and eradication programmes and disease-free status of Member States, zones and compartments (notified under document number C(2008) 6264) (Text with EEA relevance) (2009/177/EC).

Repealed by Commission Decision of 31 October 2008 implementing Council Directive 2006/88/EC as regards surveillance and eradication programmes and disease-free status of Member States, zones and compartments (notified under document number C(2008) 6264) (Text with EEA relevance) (2009/177/EC).