Commission Decision
of 1 February 2002
approving a Diagnostic Manual establishing diagnostic procedures, sampling methods and criteria for evaluation of the laboratory tests for the confirmation of classical swine fever
(notified under document number C(2002) 381)
(Text with EEA relevance)
(2002/106/EC)
THE COMMISSION OF THE EUROPEAN COMMUNITIES,
Having regard to the Treaty establishing the European Community,
Having regard to Council Directive 2001/89/EC of 23 October 2001 on Community measures for the control of classical swine fever , and in particular Article 17(3) and Article 29(1) thereof,
Whereas:
(1)
It is necessary to lay down at Community level diagnostic procedures, sampling methods and criteria for the evaluation of the results of laboratory tests for the confirmation of classical swine fever.
(2)
Annex IV to Directive 2001/89/EC lays down the functions and duties of the Community Reference Laboratory for classical swine fever in order to coordinate, in consultation with the Commission, the methods employed in the Member States for diagnosing the disease; these functions and duties include the organisation of periodic comparative tests and the supplying of standard reagents at Community level.
(3)
Classical swine fever virus is not considered to be a hazard for human health.
(4)
Laboratory tests have been recently developed to ensure a quick diagnosis of classical swine fever.
(5)
The experience gained in the control of classical swine fever in recent years has resulted in the identification of the most suitable sampling procedures and criteria for evaluation of the results of the laboratory tests for a proper diagnosis of this disease in different situations.
(6)
The measures provided for in this Decision are in accordance with the opinion of the Standing Veterinary Committee,
HAS ADOPTED THIS DECISION:
OJ L 316, 1.12.2001, p. 5.