Commission Decision
of 16 October 2001
laying down animal health conditions and veterinary certification for imports of live ratites and hatching eggs thereof from third countries including animal health measures to be applied after such importation, amending Commission Decision 95/233/EC drawing up a list of third countries from which the Member States authorise imports of live poultry and hatching eggs and amending Commission Decision 96/659/EC on protective measures in relation to Crimean Congo haemorrhagic fever
(notified under document number C(2001) 3074)
(Text with EEA relevance)
(2001/751/EC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Decision of 28 August 2006 laying down a list of third countries from which poultry, hatching eggs, day-old chicks, meat of poultry, ratites and wild game-birds, eggs and egg products and specified pathogen-free eggs may be imported into and transit through the Community and the applicable veterinary certification conditions, and amending Decisions 93/342/EEC, 2000/585/EC and 2003/812/EC (notified under document number C (2006) 3821) (Text with EEA relevance) (2006/696/EC).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX I . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX II . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .