Article 1
The laboratory at Woodham Lane, New Haw, Addlestone, Surrey KT15 3NB is designated as the institute responsible for establishing the criteria necessary for standardising the serological tests to monitor the effectiveness of rabies vaccines within the United Kingdom in accordance with the OIE Manual of Diagnostic Tests and Vaccines for Terrestrial Animals, as amended from time to time.
Art. 1 substituted (31.12.2020) by The Exotic Disease (Amendment etc.) (EU Exit) Regulations 2018 (S.I. 2018/1410), regs. 1, 5(2); 2020 c. 1, Sch. 5 para. 1(1)