Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Delegated Regulation (EU) 2016/364 of 1 July 2015 on the classification of the reaction to fire performance of construction products pursuant to Regulation (EU) No 305/2011 of the European Parliament and of the Council (Text with EEA relevance).