Article 4
1
Decision 97/347/EC shall be repealed with effect from 20 May 1998.
2
Commission Decision 94/796/EC shall be repealed with effect from 20 May 1998.
3
Terminal equipment, approved according to Decisions 97/347/EC and 94/796/EC may continue to be placed on the market and put into service.
OJ L 329, 20. 12. 1994, p. 1.