Article 3
Notified bodies designated for carrying out the procedures referred to in Article 10 of Directive 98/13/EC shall, as regards terminal equipment covered by Article 1(1) of this Decision, use or ensure the use of the harmonised standard referred to in the Annex after the coming into force of this Decision.