Article 1
1
This Decision shall apply to terminal equipment intended to be connected to a public telecommunications network and falling within the scope of the harmonised standard referred to in Article 2(1).
2
This Decision establishes a common technical regulation covering the technical characteristics, electrical and mechanical interface requirements, and access control protocol to be provided by terminal equipment which is capable of and intended by the manufacturer or his representative for connection to a T, or coincident S and T, reference point for a primary rate access at an interface to a public telecommunications network presented as a pan-European ISDN (Euro-ISDN) primary rate access point.