97/591/EC: Commission Decision
of 29 July 1997 recognizing in principle the completeness of the dossiers submitted for detailed examination in view of the possible inclusion of mefenoxam (CGA 329 351), ethoxysulfuron, famoxadone and ampelomyces quisqualis in Annex I of Council Directive 91/414/EEC concerning the placing of plant protection products on the market (Text with EEA relevance) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Plant Protection Products (Miscellaneous Amendments) (EU Exit) Regulations 2019 (S.I. 2019/556), reg. 1(1), Sch. 2 Pt. 2 (with reg. 29(2)) (as amended by S.I. 2020/1376, regs. 1(4), 3(20)); 2020 c. 1, Sch. 5 para. 1(1)

Articles . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .