PART 6

Powers of licence holders

Wayleave rights

Assignation of network wayleave rights
71
1
A network wayleave right may be assigned by a licence holder to another licence holder.
2
But a network wayleave right in respect of land that is conferred by a necessary wayleave may be assigned to another licence holder only with the consent of the Scottish Ministers.
3
A wayleave document is void to the extent that—
a
it prevents or limits the assignation of the network wayleave right to another licence holder,
b
it makes the assignation of the network wayleave right to another licence holder subject to a condition (including a condition requiring the payment of money).