PART 5

Building assessment reports

Interpretation of Part 5
67
In this Part—
- “building assessment report” has the meaning given in section 63(2),
- “non-domestic building” means a building other than a dwelling,
- “relevant person” means—
  1. a Scottish public authority within the meaning of section 3(1)(a) of the Freedom of Information (Scotland) Act 2002,
  2. such other person, or person of such description, as the Scottish Ministers may specify by regulations.
S. 67 in force at 16.1.2023 for specified purposes by S.S.I. 2022/376, reg. 2, sch.
S. 67 in force at 30.5.2023 in so far as not already in force by S.S.I. 2023/148, reg. 2(1)(2)(m)