SCHEDULE 3

COLD-SPELL HEATING ASSISTANCE REGULATIONS
PART 3

FINAL PROVISIONS

Generality of enabling power unaffected
10
Nothing in this schedule, apart from the following provisions, is to be taken to limit what may be prescribed in the regulations—
a
Chapter 1 of Part 1,
b
paragraph 9 in Part 2.