PART 11

Discharge

Discharge of debtor

Discharge of debtor to whom section 2(2) applies
140
1
Where section 2(2) applies to a debtor, the debtor is discharged on the date which is 6 months after the date on which sequestration is awarded.
2
A debtor may, following discharge, apply to AiB for a certificate of discharge in the prescribed form.