SCHEDULE 2

Private rented housing committees: procedure etc.

Duty to consult on provision for detecting fires
4
The committee must, where the application relates to the standard of repair mentioned in section 13(1)(f), consult the chief officer of the Scottish Fire and Rescue Service.
Words in Sch. 2 para. 4 substituted (1.4.2013) by Police and Fire Reform (Scotland) Act 2012 (asp 8), s. 129(2), Sch. 7 para. 70; S.S.I. 2013/51, art. 2 (with transitional provisions and savings in S.S.I. 2013/121)