Part 3

Premises licences

Review of premises licence

Review of premises licence on Licensing Board’s initiative
37
1
The appropriate Licensing Board in respect of any licensed premises in relation to which a premises licence has effect may, on their own initiative, propose to review the licence on any of the grounds for review.
2
A proposal under subsection (1) is referred to in this Act as a “premises licence review proposal”.
3
The grounds for review referred to in subsection (1) are those specified in subsection 36(3).
4
A premises licence review proposal must specify the alleged ground for review, including in particular—
a
where the ground is that specified in subsection 36(3)(a), the condition or conditions alleged to have been breached,
b
where the ground is that specified in subsection 36(3)(b), the licensing objective or objectives to which the alleged ground of review relates.