Part 4

Closure of premises

Closure orders

Closure orders
29
1
A closure order is an order that the premises specified in the order are closed to all persons for such period not exceeding 3 months as is specified in the order.
2
A closure order may be made only in respect of all or any part of premises that are the subject of a closure notice.
3
A closure order may include such provision as the sheriff (or, on appeal, the sheriff principal) making it considers appropriate about access to any part of the building or structure of which the premises specified in the order form part.