Part 5

General

Charging orders

Liability of new owner
46F
1
Subsection (2) applies where—
a
a charging order is registered in respect of a building, and
b
the order was registered at least 14 days before the date on which a person (the “new owner”) acquires right to the building.
2
The new owner is severally liable with any former owner of the building for the repayable amount for which the former owner is liable.
Ss. 46A-46H and preceding cross-heading inserted (24.1.2015) by Buildings (Recovery of Expenses) (Scotland) Act 2014 (asp 13), ss. 1(b), 3(2)