Part 1

Protection of the public at large

Disposal in case of insanity

Disposal of case where accused found to be insane
2
In section 57 (disposal of case where accused found to be insane) of the 1995 Act—
a
in subsection (2) after paragraph (b) there is inserted—
bb
make an interim hospital order;
; and
b
for subsection (3) there is substituted—
3
Where the court is satisfied, having regard to a report submitted in respect of the person following an interim hospital order, that, on a balance of probabilities, the risk his being at liberty presents to the safety of the public at large is high, it shall make orders under both paragraphs (a) and (b) of subsection (2) above in respect of that person.
.
S. 2 wholly in force at 4.10.2005; s. 2 not in force at Royal Assent, see s. 89(2); s. 2(b) in force at 27.6.2003 by S.S.I. 2003/288, art. 2, Sch.; s. 2(a) in force at 4.10.2005 by S.S.I. 2005/433, art. 2