Part 2

Water and sewerage services

Sustainable urban drainage systems

Sustainable urban drainage systems
33
1
In section 59(1) (interpretation) of the 1968 Act, insert the following definitions in the appropriate places alphabetically—
“private SUD system” means any SUD system which is not a public SUD system;
“public SUD system” means any SUD system which is vested in Scottish Water;
“road water” means the run-off of rainwater from any road for the time being entered in a list of public roads kept by a local roads authority under section 1(1) of the Roads (Scotland) Act 1984;
“SUD system” means a sustainable urban drainage system;
“sustainable urban drainage system” means a drainage system which—
a
facilitates attenuation, settlement or treatment of surface water from 2 or more premises (whether or not together with road water), and
b
includes one or more of the following: inlet structures, outlet structures, swales, constructed wetlands, ponds, filter trenches, attenuation tanks and detention basins (together with any associated pipes and equipment);
.
2
Schedule 3 makes modifications of the 1968 Act and the Water Industry (Scotland) Act 2002 (asp 3) in relation to sustainable urban drainage systems.