SCHEDULE

Location of the regulated works
1
The centre point of each of the turbines is to be at the following reference points—
Turbine No. | Easting (m) | Northing (m)
A1 | 290703 | 543168
A2 | 291153 | 542982
B1 | 290130 | 542923
B2 | 290524 | 542739
B3 | 290962 | 542541
B4 | 291367 | 542368
B5 | 291753 | 542132
C1 | 289517 | 542725
C2 | 289955 | 542530
C3 | 290352 | 542343
C4 | 290789 | 542134
C5 | 291181 | 541954
C6 | 291592 | 541751
D1 | 288897 | 542509
D2 | 289324 | 542311
D3 | 289777 | 542101
D4 | 290174 | 541915
D5 | 290602 | 541720
D6 | 290996 | 541539
D7 | 291424 | 541341
E1 | 288346 | 542239
E2 | 288711 | 542068
E3 | 289150 | 541873
E4 | 289583 | 541672
E5 | 289989 | 541489
E6 | 290416 | 541299
E7 | 290826 | 541088
E8 | 291237 | 540902
F1 | 288118 | 541830
F2 | 288560 | 541691
F3 | 288985 | 541449
F4 | 289405 | 541259
F5 | 289810 | 541075
F6 | 290246 | 540875
F7 | 290649 | 540678
F8 | 291067 | 540490
G1 | 287916 | 541413
G2 | 288343 | 541214
G3 | 288806 | 541024
G4 | 289227 | 540846
G5 | 289628 | 540661
G6 | 290060 | 540474
G7 | 290471 | 540285
G8 | 290901 | 540099
H1 | 288175 | 540806
H2 | 288621 | 540590
H3 | 289032 | 540418
H4 | 289453 | 540247
H5 | 289874 | 540061
H6 | 290303 | 539874
H7 | 290733 | 539706
J1 | 288425 | 540126
J2 | 288846 | 539948
J3 | 289267 | 539786
J4 | 289688 | 539616
J5 | 290109 | 539438
J6 | 290505 | 539284
K1 | 288660 | 539527
K2 | 289089 | 539349
K3 | 289502 | 539171